Rivet 1.2.0 some older rev.

data 0.0055

0.006

0.0065

0.007

0.0075

0.008

0.0085

0.009

0.0095Ratio (w.r.t. π^±) of mean D^+s multiplicity

Relative multiplicity90.690.89191.291.40.60.811.21.4

MC/data